0 20 40 60 80 100

0.05 0.1 0.15 0.2 0.25

The case 9 in steady-state. The curve is plotted every 10 minutes

L

0 20 40 60 80 100 0.1 0.2 0.3

LRout

0 20 40 60 80 100

0.02

0.04

0.06

0.08

LRin

0 20 40 60 80 100

0.2 0.4

LRtot

0 20 40 60 80 100

0.005

0.01

0.015

0.02

Rout

0 20 40 60 80 100

8 10

Rin

0 20 40 60 80 100 2 4 6 8 10 12

LNout

0 50 100 150 200 0

50

LNin

0 20 40 60 80 100 80 100 120 140 160 180

Nout

0 20 40 60 80 100 1 1.5 x 10^7

Nin