0 20 40 60 80 100 0

2

4

6

0 20 40 60 80 100 0

2

4

6

LRtot-dataset 3a

Error in v_L= 0.13

0 20 40 60 80 100 0 1 2 3 4 5 x 10^{-3}

microns

0 20 40 60 80 100 0 1 2 3 4 5 x 10^{-3}

LRtot-dataset 3 microns

Error in v_L= 0.15

0 20 40 60 80 100 0

0.5

1 Dynamics--every hour upto 10 hours

0 20 40 60 80 100 0

0.5

1

LRtot-dataset 1

Error in v_L= 0.43

Steady-State. Red: double v_L