0 20 40 60 80 100 0 2 4 6 8 x 10^{-4}

LRtot-dataset 3 every hour

0 20 40 60 80 100 0

0.5

1 x 10^{-4} zoom in of the left

0 20 40 60 80 100 0

0.5

1

The solution at 1 hour is at the top

0 20 40 60 80 100 2 4 6 8 10 x 10^{-5}

Error in v_L= 0.24